CO2 Concentration (ppm)

Carbon dioxide concentration at Mauna Loa Observatory

February 01, 2022

Full Record ending February 1, 2022

1960 1965 1970 1975 1980 1985 1990 1995 2000 2005 2010 2015 2020 310 320 330 340 350 360 370 380 390 400 410 420