Siemens Residual Scaled by √(N/(N-1))

Cumulative Probability

Overlap replicates Old dir 9999-01-01-01.01.01 1605 Points

-1.5 -1 -0.5 0 0.5 1 1.5

0.003

0.01

0.02

0.05

0.10

0.25

0.50

0.75

0.90

0.95

0.98

0.99

0.997

New Old

Interf Residual Scaled by √(N/(N-1))

1680 Points

-50 -40 -30 -20 -10 0 10 20 30 40 50

0.003

0.01

0.02

0.05

0.10

0.25

0.50

0.75

0.90

0.95

0.98

0.99

0.997